DCM- TAP 1st Order BU Maps

- 60 - 40 - 20 0 20 40 60

Y HcmL 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

Flux Hc�s - cm^2L

112178 - 2.062 keV - 89.5 ma

- 60- 40- 200204060

Y HcmL

00.10.20.30.40.5

Flux Hc�s - cm^2L

112166 - 2.077 keV - 90 ma 0 0.250.5

0.751

1.251.5

1.75

Flux Hc�s - cm^2L

112177 - 2.047 keV - 90 ma 00.10.20.30.40.50.6

112156 - 2.062 keV - 90 ma 0 113391 - 2.047 keV - 90 ma 00.20.40.60.8

113480 - 2.047 keV - 90 ma

113477 - 1.978 keV - 90 ma 00.511.52

112155 - 2.047 keV - 89 ma