DCM- TAP 1st Order BU Maps

- 60 - 40 - 20 0 20 40 60

Y HcmL 0

0.1

0.2

0.3

0.4

0.5

Flux Hc�s - cm^2L

112225 - 1.893 keV - 90 ma

- 60- 40- 200204060

Y HcmL

00.10.20.30.40.50.6

Flux Hc�s - cm^2L

112191 - 1.893 keV - 90 ma 00.20.40.60.8

112224 - 1.873 keV - 90 ma 00.10.20.30.40.50.60.7

112190 - 1.883 keV - 90 ma 00.20.40.60.811.2

112188 - 1.863 keV - 89 ma

112189 - 1.873 keV - 90 ma 0246810

Flux Hc�s - cm^2L

112261 - 1.848 keV - 89 ma 00.511.522.5

112226 - 1.853 keV - 90 ma