DCM- TAP 1st Order BU Maps

- 60 - 40 - 20 0 20 40 60

Y HcmL 0

10

20

30

40

50

60

70

Flux Hc�s - cm^2L

112259 - 1.838 keV - 90 ma

- 60- 40- 200204060

Y HcmL

010203040

Flux Hc�s - cm^2L

112260 - 1.843 keV - 90 ma 02468101214

112250 - 1.828 keV - 30 ma 012345

Flux Hc�s - cm^2L

112251 - 1.833 keV - 19 ma

113396 - 1.798 keV - 90 ma 02468

112252 - 1.828 keV - 19 ma 00.20.40.60.811.2

Flux Hc�s - cm^2L

112153 - 1.698 keV - 90 ma 00.20.40.60.811.21.4

113393 - 1.698 keV - 90 ma