DCM- TAP 1st Order BU Maps

- 60 - 40 - 20 0 20 40 60

Y HcmL 0

0.2

0.4

0.6

0.8

Flux Hc�s - cm^2L

113463 - 1.569 keV - 90 ma

- 60- 40- 200204060

Y HcmL

00.20.40.60.8

Flux Hc�s - cm^2L

113387 - 1.569 keV - 90 ma

113386 - 1.529 keV - 90 ma- 60

- 40- 200204060 Y HcmL

00.10.20.30.40.5

Flux Hc�s - cm^2L

113471 - 1.569 keV - 90 ma - 60- 40- 200204060

00.20.40.60.8

113388 - 1.399 keV - 90 ma

112152 - 1.449 keV - 90 ma 0 0.02

0.04

0.06

0.080.1

Flux Hc�s - cm^2L

112149 - 0.95 keV - 90 ma 0 0.050.1

0.150.2

0.250.3

112150 - 1.199 keV - 90 ma