HIREFS1st Order BU Maps

- 60 - 40 - 20 0 20 40 60

Y HcmL 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

Flux Hc�s - cm^2L

113350 - 1.876 keV - 91 ma

- 60- 40- 200204060

Y HcmL 0 0.02

0.04

0.06

0.080.1

Flux Hc�s - cm^2L

113352 - 1.919 keV - 90 ma 0 0.050.1

0.150.2

113340 - 1.616 keV - 91 ma 05101520253035

Flux Hc�s - cm^2L

113359 - 1.775 keV - 91 ma 0 113336 - 1.569 keV - 61 ma 0 113341 - 1.616 keV - 91 ma 0 113354 - 1.546 keV - 91 ma 0 113338 - 1.569 keV - 61 ma