HIREFS1st Order BU Maps

- 60 - 40 - 20 0 20 40 60

Y HcmL

0

0.02

0.04

0.06

0.08

0.1

Flux Hc�s - cm^2L

113348 - 1.28 keV - 91 ma

- 60- 40- 200204060

Y HcmL

00.10.20.30.40.50.6

Flux Hc�s - cm^2L

113357 - 1.384 keV - 91 ma 0 0.050.1

0.150.2

Flux Hc�s - cm^2L

113315 - 1.177 keV - 91 ma 0 0.02

0.04

0.06

0.080.1

113346 - 1.25 keV - 91 ma 0 113311 - 1.046 keV - 91 ma 0 113313 - 1.078 keV - 91 ma 0 113321 - 0.785 keV - 91 ma 0 113296 - 0.785 keV - 91 ma