DCM- Ge 1st Order BU Maps

- 60 - 40 - 20 0 20 40 60 Y HcmL 0

0.5

1

1.5

2

2.5

3

Flux Hc�s - cm^2L

113448 - 6.294 keV - 90 ma

- 60- 40- 200204060 Y HcmL

00.511.522.533.5

Flux Hc�s - cm^2L

113450 - 8.988 keV - 90 ma 00.511.522.5

113444 - 5.246 keV - 90 ma

113446 - 5.645 keV - 90 ma 00.511.52

113417 - 4.897 keV - 90 ma

113419 - 5.056 keV - 90 ma