DCM- Ge 1st Order BU Maps

- 60 - 40 - 20 0 20 40 60

Y HcmL 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

Flux Hc�s - cm^2L

113407 - 3.498 keV - 90 ma

- 60- 40- 200204060

Y HcmL 0 0.250.5

0.751

1.251.5

1.75

Flux Hc�s - cm^2L

113415 - 4.507 keV - 90 ma 00.10.20.30.4

Flux Hc�s - cm^2L

112218 - 3.169 keV - 90 ma 00.10.20.30.40.50.6

112258 - 3.498 keV - 90 ma

112216 - 2.999 keV - 90 ma

112217 - 3.069 keV - 90 ma 0 0.050.1

0.150.2

0.250.3

112214 - 2.869 keV - 90 ma

112215 - 2.969 keV - 90 ma