DCM- Ge 1st Order BU Maps

- 60 - 40 - 20 0 20 40 60

Y HcmL 0

0.05

0.1

0.15

0.2

0.25

0.3

Flux Hc�s - cm^2L

112256 - 2.774 keV - 90 ma

- 60- 40- 200204060

Y HcmL 0 0.050.1

0.150.2

0.250.3

Flux Hc�s - cm^2L

112257 - 2.799 keV - 90 ma 0 112255 - 2.749 keV - 90 ma 0 112213 - 2.769 keV - 90 ma 0 112253 - 2.699 keV - 90 ma 0 112254 - 2.724 keV - 90 ma 0 112201 - 2.669 keV - 90 ma 0 112200 - 2.669 keV - 90 ma