DCM- Ge 1st Order BU Maps

- 60 - 40 - 20 0 20 40 60

Y HcmL 0

0.05

0.1

0.15

0.2

0.25

0.3

Flux Hc�s - cm^2L

113400 - 2.559 keV - 90 ma

- 60- 40- 200204060

Y HcmL 0 0.050.1

0.150.2

Flux Hc�s - cm^2L

112212 - 2.569 keV - 90 ma 0 113457 - 2.559 keV - 90 ma 0 113435 - 2.559 keV - 90 ma 0 112210 - 2.469 keV - 90 ma 0 112211 - 2.499 keV - 90 ma 0 113405 - 2.349 keV - 90 ma 0 112205 - 2.369 keV - 89 ma