DCM- Ge 1st Order BU Maps

- 60 - 40 - 20 0 20 40 60

Y HcmL

0

0.05

0.1

0.15

0.2

Flux Hc�s - cm^2L

112204 - 2.27 keV - 90 ma

- 60- 40- 200204060

Y HcmL

00.10.20.30.4

Flux Hc�s - cm^2L

113399 - 2.29 keV - 90 ma 0 0.050.1

0.150.2

Flux Hc�s - cm^2L

113398 - 2.23 keV - 90 ma 0 113403 - 2.26 keV - 90 ma 0 113459 - 2.19 keV - 90 ma 0 113401 - 2.19 keV - 90 ma 0 112202 - 2.07 keV - 90 ma 0 112203 - 2.17 keV - 90 ma